language: en

Finding Genes in DNA with a Hidden Markov Model

John Henderson Steven Salzberg Kenneth H. Fasman

Abstract This study describes a new Hidden Markov Model (HMM) system for segmenting uncharacterized genomic DNA sequences into exons, introns, and intergenic regions. Separate HMM modules were designed and trained for specific regions of DNA: exons, introns, intergenic regions, and splice sites. The models were then tied together to form a biologically feasible topology. The integrated HMM was trained further on a set of eukaryotic DNA sequences, and tested by using it to segment a separate set of sequences. The resulting HMM system, which is called VEIL (Viterbi Exon-Intron Locator), obtains an overall accuracy on test data of 92% of total bases correctly labelled, with a correlation coefficient of 0.68. Using the more stringent test of exact exon prediction, VEIL correctly located both ends of 46% of the exons. Moreover, more than 50% of the exons it predicts are exactly correct. These results compare favorably to the best previous results for gene structure prediction, and demonstrate the benefits of using HMMs for this problem.

1 Introduction