language: en

State Reconstruction for Determining Predictability in Driven Nonlinear Acoustical Systems

[Diploma Thesis]

MEDIA LABORATORY Massachusetts Institute of Technology

[Professor Neil Gershenfeld Institut fur Elektrische Nachrichtentechnik Rheinisch-Westphalische Technische Hochschule Aachen Univ. Professor Dr.-Ing. H.D. Luke]

by Bernd Schoner
May 1996