language: en

DEPARTMENT OF STATISTICS University of Wisconsin
1210 West Dayton St. Madison, WI 53706
TECHNICAL REPORT NO. 910 December 21, 1993

Behavior Near Zero of the Distribution of GCV Smoothing Parameter Estimates 1

by Grace Wahba and Yuedong Wang

[1 Supported by the National Science Foundation under Grant DMS-9121003 and the National Eye Institute under Grant R01 EY09946.]

e-mail wahba@stat.wisc.edu, wang@stat.wisc.edu